0601501105514000000000000000000000000000 PRINT THE REPORT  -  Select This Option When You Are Ready To Print The
 Report.  You Will Be Prompted To Select Where The Report Output Will Be
 Directed.  Choices:  SCREEN; PRINTER; Or DISK.

 SELECT ALTERNATE KEYS  -  Select This Option When You Want To Run A Report
 Using An ALTERNATE KEY.  The Default KEY Is DESCRIPTIVE NAME.

 RANGE SELECTIONS  -  Select This Option When You Want To Run A Report That
 Includes A Specific Set Of Items Within A RANGE Of Values For A Field.  You
 May Specify RANGES For Multiple Fields So That An Exact Set Of Items Are
 Included.  RANGE Options For This Report Are:  DESCRIPTIVE NAME; PRIORITY;
 PHYSICAL LOCATION; VENDOR; MAKE; MODEL; And, YEAR ACQUIRED.

 CHECK PAPER ALIGNMENT  -  Select This Option To Ensure That The Paper Is
 Properly Aligned In The Printer.
0607441005514000000000000000000000000000 SELECT ALTERNATE KEYS

   The DEFAULT Processing Order For This Report Is By Firm Name.

   You May Choose To Have The Report Run In Any Other KEY Order.

   To Select ALTERNATE KEY, Move Selection Bar To The ALTERNATE
   KEY Of Choice And Press ENTER.

 CHECK PAPER ALIGNMENT

   If You Want To CHECK PAPER ALIGNMENT Press "Y" At The Prompt
   For Checking Paper Alignment.  If You Press ENTER Or "N" The
   Main Print Menu Will Be Displayed.
0c01500c02514000000000000000000000000000
06044a1005514000000000000000000000000000 OUTPUT SELECTION

  Any Report Generated By COMET May Be Directed To The SCREEN, PRINTER,
  Or DISK.  In Addition, You May Run A Report Again With A Different
  Choice For OUTPUT.


 RANGE SELECTION

  Any Report Generated By COMET May Be Filtered To Include A Specific
  RANGE Of Items.  You May Set A RANGE For Each Field Listed On The
  Selection List.  RANGES Are Not Automatically Reset At The End Of
  A Report, So You Will Be Required To Extend The RANGES If You Want
  All Of The Items To Be Included In A Report.
0a05480605514000000000000000000000000000  OUTPUT FILENAME:  Enter The Filename For The Current Report.  You
  May Enter Eight (8) Characters In The Space Provided.  If You Press
  ENTER Without Keying In A Specific Name The Report Will Be Written
  To A File Bearing The Name "OUT.LST" In The Current Directory.

0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  LOCATION OF ITEM RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Cause The Program To Return To
  The Range Selection Menu Without Setting A Dynamic Range.  Once A Dynamic
  Range Has Been Defined, It Remains In Effect For All Subsequent Reports
  Until It Is Either Changed By The User By Entering New "FROM" And "TO"
  Values Or The User Exits Form The LOG LISTING MENU.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  DESCRIPTIVE NAME RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Causes The Program To Return To
  The Range Selection Menu Without Setting A Dynamic Range.  Once A Dynamic
  Range Has Been Defined, It Remains In Effect For All Subsequent Reports
  Until It Is Either Changed By The User By Entering New "FROM" And "TO"
  Values Or The User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  VENDOR RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Causes The Program To Return To
  The Range Selection Menu Without Setting A Dynamic Range.  Once A Dynamic
  Range Has Been Defined.  It Remains In Effect For All Subsequent Reports
  Until It Is Either Changed By The User By Entering New "FROM" And "TO"
  Values Or The User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  PRIORITY RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Causes The Program To Return To
  The Range Selection Menu Without Setting A Dynamic Range.  Once A Dynamic
  Range Has Been Defined, It Remains In Effect For All Subsequent Reports
  Until It Is Either Changed By The User By Entering New "FROM" And "TO"
  Values Or The User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  YEAR ACQUIRED RANGE SELECTION:

  Dynamic Range Selection Prmits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value TO Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  A YEAR ACQUIRED Range Must Be Entered By The User And Pressing The Esc Key
  Has No Effect.  To Include All Data, Enter "FROM" And "TO" Values That Will
  Include All Possible Records In The PROPERTY BOOK File.  Dynamic Range
  Values Remain In Effect For All Subsequent Reports Until Either The User
  Changes The Range Or The User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  FACTORY NAME RANGE SELECTION:

  Dynamic Range Selection Perits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Causes The Program To Return To
  The Range Selection Menu Without Setting A Dynamic Range.  Once A Dynamic
  Range Has Been Defined, It Remains In Effect For All Subsequent Reports
  Until It Is Either Changed By The User By Entering New "FROM" And "TO"
  Values Or The User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  MODEL RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Causes The Program To Return To
  The Main Print Menu Without Setting A Dynamic Range.  Once A Dynamic Range
  Has Been Defined, It Remainds In Effect For All Subsequent Reports Until It
  Is Either Changed BY The User By Entering New "FROM"  And "TO" Values Or The
  User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  DATE REVISED RANGE SELECTION:                           FORMAT:  YYMMDD

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  A DATE Range Must Be Entered And Pressing The Esc Key Has No Effect.  To
  Include All Data, Enter "FROM" And "TO" Values That Include All Possible
  DATES In The PROPERTY BOOK File.  A Dynamic Range Remains In Effect For All
  Subsequent Reprots Until It Is Either Changed By The User By Entering New
  "FROM" And "TO" Values Or The User Exits From The LOG LISTING Menu.

0c01500c02514000000000000000000000000000
0601501105514000000000000000000000000000  RECORD NUMBER RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Includded On The
  Report.  The "TO" Value Sets The Highest (ENDING) Value To Be Included On
  The Report.

  A RECORD NUMBER Range Must Be Entered By The User And Pressing The Esc Key
  Has No Effect.  To Include All Data, Enter "FROM" And "TO" Values That Will
  Include All Possible Records In The PROPERTY BOOK File.  Dynamic Range
  Values Remain In Effect For All Subsequent Reports Until Either The User
  Changes The Range Or The User Exits From The LOG LISTING Menu.

0601501105514000000000000000000000000000  MODEL RANGE SELECTION:

  Dynamic Range Selection Permits The User To Select A SubSet Of The Data
  Stored In The PROPERTY BOOK File.

  The User Is Prompted To Enter A "FROM" And "TO" Boundary For The Range.
  The "FROM" Value Sets The Lowest (Beginning) Value To Be Included On The
  Report.  The "TO" Value Sets The Highest (Ending) Value To Be Included On
  The Report.

  Pressing The Esc Key At The "FROM" Prompt Causes The Program To Return To
  The Range Selection Menu Without Setting A Dynamic Range.  Once A Dynamic
  Range Has Been Defined, It Remainds In Effect For All Subsequent Reports
  Until It Is Either Changed BY The User By Entering New "FROM"  And "TO"
  Values Or The User Exits From The LOG LISTING Menu.

