@PrnDesc                                                             
Printer Description - The printer description may be up to 30 charac-
ters. This description is used for reference only.                   
                                                                     
@PrnPort                                                             
Printer Port - Enter a number form 1-9. If your printer is connected 
to LPT1, enter 1. If your printer is connected to COM1, enter the DOS
mode command, MODE LPT1:=COM1: in your AUTOEXEC.BAT file and enter  1
for the printer port.                                                
                                                                     
@PicaCode                                                            
Pica Pitch Codes - Enter the decimal control codes to print Normal 10
characters per inch. You may enter up to ten, three digit codes.     
                                                                     
@EliteCode                                                           
Elite Pitch Codes - Enter the decimal control codes to print ELITE 12
characters per inch. You may enter up to ten, three digit codes.     
                                                                     
@CondCode                                                            
Condensed Pitch Codes - Enter the decimal control codes to print Con-
densed 17 characters per inch. You may enter up to  ten, three  digit
codes.                                                               
                                                                     
@ResetCode                                                           
Reset Control Codes - Enter the decimal control codes to Reinitialize
your printer.                                                        
                                                                     
@LMargCode                                                           
Left Margin Codes - Enter the decimal control codes used to  set  the
left margin.                                                         
                                                                     
@LSpceCode                                                           
n/216 Line Spacing Codes - Enter the decimal control  codes  used  to
set line spacing to n/216 inch.                                      
                                                                     
@LFeedCode                                                           
n/216 Line Feed Codes - Enter the decimal control codes used to  per-
perform one n/216 inch line feed.                                    
                                                                     
@GrafCode                                                            
Double Densisty 8-bit Graphics - Enter the decimal control  codes  to
print double density 8-bit graphics.                                 
                                                                     
@The End                                                             
This is the end.                                                     
