┌────┐
│TAB │ = To begin 1-minute keying session.
└────┘
┌────┐
│  + │ = (Plus Bar) To enter completed number.
└────┘
┌────┐
│ CR │ = (Entry Clear) To delete a keystroke error.
└────┘
┌────┐
│END │ = To end Keypad session prior to one minute.
└────┘
 Note:  The decimal value is automatically positioned
        in each number and is not to be keyed in.

        Your keystroke entries are displayed on the
        simulated tape at the right side of screen.
