
 Depress the [Tab] key to begin.

 The object of this session is to keystroke at a
 controlled rate.  All errors are to be deleted with the
 Clear Entry key.

 Each of the three test trials must continue for the full
 1-minute period.  Only the best of the three trials is
 graded and entered into the cumulative grade average.

 Your keystroke entries are displayed on the simulated
 tape located at the right side of the screen.
