Installation Completed

The application has been installed successfully and it is ready to run.

Should you want to uninstall this application, you can double click on the icon named "Uninstall" in the program group.

Click on "OK".


Restart DOS

Your AUTOEXEC.BAT and/or CONFIG.SYS have been updated. As a result you need to restart DOS for the changes to take effect.

Click on "Restart" to reboot your computer.

Click on "Stay Here" to stay in Windows. You should not run the application just installed until the next time you turn on your computer.


Restart Windows

Your Windows system files have been updated. As a result you need to restart Windows for the changes to take effect.

Click on "Restart" to restart Windows.

Click on "Stay Here" to stay in Windows. You should not run the application just installed until the next time you enter Windows.


Enter Installation Target Directory
Enter Install Target Directory

Here you enter the install target directory, i.e., the directory into which the files will be copied.

Click on "OK" to install the software to that directory you just entered.

Click on "Cancel" to abort the installation.


Version Attribute Incompatible

Usually this means that you are trying to install a file with different language or character set from your existing file. The detailed attributes of the new file are shown in the left side and those of the existing file are shown in the right side.

Click on"Copy" to copy the file.

Click on "Skip" to not to copy the file and continue with the installation.

In this situation, it is recommended that you edit the target path and then choose "Copy" to install the file under another name.


Abort Installation

You are going to abort the installation!!!

Click on "Yes" to abort the installation.

Click on "No" to continue the installation.

If you abort, you will need to delete the files that have already been copied onto your system. You can delete them manually, or if there are two files called llatsni.exe and filog.ini in your Windows directory, then you can run something like:

llatsni c:\windows\filog.ini

to perform the uninstallation. If you do not have both of these two files, then you will have to manually delete installed files.


Insert Disk

The next distribution disk is needed. Please insert the disk labeled as requested into the drive.

Click on "OK" to continue the installation.

Click on "Cancel" to abort the installation.


Enter User Information

Please enter your name and your company name here.  However, If the package has been installed by someone else, his or her information may be displayed here and cannot be changed or deleted.

The name you enter must consist of "usual" characters only and must be at least four characters long. You can leave the company name unspecified.

Click on "OK" to continue the installation.

Click on "Cancel" to abort the installation.


Welcome

This program will install the files onto your system and create the appropriate icons for you in Program Manager.

Click on "Install" to start to the installation.

Click on "don't Install" to return to Windows without further action. Your system won't be changed in any way.


Installation Help

We are installing the application onto your system.

If you are confused, please contact your system manager.

Welcome

Enter User Information

Insert Disk

Abort Installation

Version Attribute Incompatible

Enter Install Target Directory

Restart Windows

Restart DOS

Installation Completed

Modifying DOS System Files

Select What To Install


Select What To Install

This is where you select which parts of the application that you would like to install.

Click on the check box to the left of a component to select (install) or deselect (not install) it.

Click on the plus (+) sign to expand a component to see what is in it. Then the plus sign will change to a minus (-) sign, on which you can click again to collapse the list. If there is no plus sign or minus sign there, but just a small dot, then there is nothing else in the component except itself.

Click on the text part of an item to see the detailed description on it in the window labeled "Description".

The following information is also shown:

1. The total size of the current selection.

2. The total size of the whole application.

3. The available hard disk space.

It is recommended that you choose "Typical Install" or "Maximum Install" whenever available. Choose "Custom Install" only when you know what you are doing.

Click on "OK" to continue the installation.

Click on "Cancel" to abort the installation.


Modifying DOS System Files

We are going to modify AUTOEXEC.BAT or CONFIG.SYS.

The current (unmodified) contents of the file are shown on the left side and the proposed contents are shown on the right side. You can inspect and/or edit the proposed contents if you know what you are doing.

Click on "Save" to update the file and backup the original. You can specify the name of the backup in the edit control "backup as".

Click on "Don't Save" to not to update and keep the original untouched. THE APPLICATION MAY NOT RUN AFTER INSTALLATION.

It is recommended that you choose "Save". If something goes wrong later, you can either use the backup to restore the system or uninstall the application.